HTTP/1.1 200 OK
Date: Wed, 18 Dec 2024 19:38:24 GMT
Server: Oracle-Application-Server-10g/10.1.2.0.2 Oracle-HTTP-Server
Connection: close
Transfer-Encoding: chunked
Content-Type: text/html; charset=iso-8859-1

<!DOCTYPE HTML PUBLIC "-//IETF//DTD HTML 2.0//EN">
<HTML><HEAD>
<TITLE>200 OK</TITLE>
</HEAD><BODY>
<H1>OK</H1>
The server encountered an internal error or
misconfiguration and was unable to complete
your request.<P>
Please contact the server administrator,
 you@your.address and inform them of the time the error occurred,
and anything you might have done that may have
caused the error.<P>
More information about this error may be available
in the server error log.<P>
<HR>
<ADDRESS>Oracle-Application-Server-10g/10.1.2.0.2 Oracle-HTTP-Server Server at usncvp003.diebold.com Port 4040</ADDRESS>
</BODY></HTML>
